Copyright: Digital Equipment Corporation


DC21040 PCI Ethernet Controller

Use this dialog box to setup the network connection for the Digital Equipment Corporation DC21040 PCI Ethernet controller .

AutoDetection

Twisted Pair

Twisted Pair - Full Duplex

Twisted Pair - No Link Test

BNC

AUI


multia's Ethernet Controller

Use this dialog box to setup the network connection for the Digital Equipment Corporation multia's Ethernet controller .

AutoDetection

Twisted Pair

Twisted Pair - Full Duplex

Twisted Pair - No Link Test

BNC

AUI


DE434 PCI Ethernet adapter card

Use this dialog box to setup the network connection for the Digital Equipment Corporation DE434 PCI Ethernet adapter card.

Twisted Pair

Twisted Pair - FullDuplex

Twisted Pair - No Link Test


DE435 PCI Ethernet adapter card

Use this dialog box to setup the network connection for the Digital Equipment Corporation DE435 PCI Ethernet adapter card .

AutoDetection

Twisted Pair

Twisted Pair - Full Duplex

Twisted Pair - No Link Test

BNC

AUI


DE436 PCI Quad Ethernet adapter card

Use this dialog box to setup the network connection for the Digital Equipment Corporation DE436 PCI Quad Ethernet adapter card .

Twisted Pair

Twisted Pair - Full Duplex

Twisted Pair - No Link Test


EB40 PCI Evaluation board

Use this dialog box to setup the network connection for the Digital Equipment Corporation EB40 PCI Evaluation board.

Twisted Pair

Twisted Pair - Full Duplex

Twisted Pair - No Link Test


DC21140 PCI Fast Ethernet Controller

Use this dialog box to setup the network connection for the Digital Equipment Corporation DC21140 PCI Fast Ethernet controller .

100Mbps

100Mbps - Full Duplex

10Mbps

10Mbps - Full Duplex


SMC 8432 PCI Ethernet adapter card

Use this dialog box to setup the network connection for the Standard Microsystems Corporation SMC 8432 PCI Ethernet adapter card .

AutoDetection

Twisted Pair

Twisted Pair - Full Duplex

Twisted Pair - No Link Test

BNC

AUI


SMC 9332 PCI Fast Ethernet adapter card

Use this dialog box to setup the network connection for the Standard Microsystems Corporation SMC 9332 PCI Fast Ethernet adapter card .

100Mbps

100Mbps - Full Duplex

10Mbps

10Mbps - Full Duplex


AutoDetection
Check in sequence the Twisted Pair port, the BNC port and the AUI port and select the first connected port.

This detection takes place during driver initialization.Ports should be connected before the system is restarted and  cannot be switched during run time.

Autodectection does not support TP - Full Duplex mode.


Twisted Pair
Establish a 10BaseT connection through the Twisted Pair port.


Twisted Pair - Full Duplex
Establish a Full Duplex 10BaseT (20 Mbps) connection through the Twisted Pair port.


Twisted Pair - No Link Test
Establish a 10BaseT connection with no Link Integrity Test through the Twisted Pair port.

Select this option if the adapter is connected to a hub which does not generate link pulses to check the link integrity.


BNC
Establish a 10Base2 (Thinwire) connection through the BNC connector port.


AUI
Establish a 10Base5 (Thickwire) connection through the AUI 15_pin connector port.


100Mbps
Establish a Fast Ethernet (100Mbps) connection through the 100Mbps port.


100Mbps - Full Duplex
Establish a Fast Ethernet Full Duplex (200 Mbps) connection through the 100Mbps port.


10Mbps
Establish a 10BaseT connection through the 10Mbps port.


10 Mbps - Full Duplex
Establish a Full Duplex 10BaseT (20 Mbps) connection through the 10Mbps port.